MRTG + FireDaemon_{(HOWTO)}

Introduction

http://ee-staff.ethz.ch/~oetiker/webtools/mrtg/ http://ee-staff.ethz.ch/~oetiker/webtools/mrtg/nt-guide.html

Hardware

VMware virtual machine.

Software

We downloaded and installed the following software. NOTE - NOTE - NOTE . We noticed that MRTG sometimes falls over when installed in a directory with a space in the

Software Version URL Installation Location

MRTG v2.9.17 http://ee-staff.ethz.ch/~oetiker/webtools/mrtg/ C:\apps\mrtg-2.9.17 ActiveState Perl v5.6.0.623 http://www.activestate.com/Products/ActivePerl/ C:\apps\perl FireDaemon v0.09c http://www.firedaemon.com C:\apps\firedaemon VIM v5.7 http://www.vim.org C:\apps\vim57 Apache v1.3.20 http://www.apache.org/httpd/ C:\apps\apache

MRTG Configuration

Setup a simple SNMP configuration under SW: 07.1.15T12 on the ServerIronXL:

snmp-server community public ro
snmp-server community private rw
snmp-server contact James Bourne
snmp-server location Sydney, Australia

We also recommend that you name your interfaces as appropriate using the commands as follows:

int e 1
port-name Interface 1
int e 2
port-name Interface 2

Then we created a configuration file as follows:

mkdir c:\apps\apache\htdocs\mrtg
cd c:\apps\mrtg-2.9.17\bin
perl cfgmaker public@10.1.251.1 --global "WorkDir: C:\Apps\Apache\htdocs\mrtg" --output foundry.cfg

Then edited foundry.cfg:

vim router.cfg

And appended the lines at the end of the file as follows: RunAsDaemon: yes Interval: 5 the Task Manager since it has been daemonised):

perl mrtg --logging mrtg.log foundry.cfg

FireDaemon Configuration

what we did:

c:

firedaemon -p (or firedaemonui if it is installed)

Now answer the FireDaemon questions exactly as follows (your paths might differ depending on where you installed Perl and MRTG):

Auto Restart Application --> y

Process Priority --> 0

Auto Start Service --> y

net start mrtg

What If It All Goes Horribly Wrong?

messages:

The FireDaemon Process was Started The Service Failed To Shutdown Correctly ... SubProcess Monitoring Failed ...

some patience.

with relevant logon scripts to remount the network drives.

This is the approach we use to track down MRTG errors.

Ensure that your MRTG Service has been stopped: net stop mrtg Ensure that you have read ALL the MRTG documentation Ensure that you have followed the configuration HOWTO to letter above Open a console window (command prompt) Change directory to your MRTG bin folder (eg. C:\apps\mrtg-2.9.17\bin) Edit the file ’mrtg’ with your text editor (eg. vim mrtg) Look for the following line: @main::DEBUG=qw(); Modify this line to read the following: @main::DEBUG=qw(base); Save and quit out of your text editor Now attempt to run MRTG damonised manually: perl mrtg --logging mrtg.log foundry.cfg If you want even more debugging: perl -w mrtg --logging mrtg.log foundry.cfg (or -W) Any configuration or processing errors will be easy to spot Review the contents of your log file is you specified the --logging option

2001-06-09 10:24:45 -- Started mrtg
2001-06-09 10:24:45 -- --base: Creating Lockfiles foundry.cfg_l,foundry.cfg_l_1636
2001-06-09 10:24:45 -- --base: Reading Config File: foundry.cfg
2001-06-09 10:24:45 -- --cfg: foundry.cfg[1]: # Created by
2001-06-09 10:24:45 -- --cfg: foundry.cfg[2]: # cfgmaker public@10.1.251.1 --global ’WorkDir: C:\Apps\Apache\htdocs\mrtg’ --output foundry.cfg
2001-06-09 10:24:45 -- --cfg: foundry.cfg[3]:

2001-06-09 10:35:43 -- ERROR: CFG Error in "Interval": should be at least 5 Minutes at C:/Apps/mrtg-2.9.17/bin\..\lib\mrtg2/MRTG_lib.pm line 642.

Network Drives ...

Remove your existing service: firedaemon -u mrtg Reinstall the service with FireDaemon checking that the arguments you are passing to it are correct.

with FireDaemon.

Sublime Solutions